showturtle  -- Command, no inputs.  Abbreviation: st
     This command applies only to the  display  turtle.   It  restores  the
     display  of  the  turtle,  after the hideturtle command has been used.
     (Note:  On the Tektronix display, the turtle is never visible.)
